%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Tsai_etal2010} Tsai, C. - G., Wang, L. - C., Wang, S. - F., Shau, Y. - W., Hsiao, T. - Y., \& Auhagen, W. (2010). Aggressiveness of the Growl-Like Timbre: Acoustic Characteristics, Musical Implications, and Biomechanical Mechanisms. \textit{Music Perception}, \textit{27}(3), 209--222.

\end{thebibliography}

\end{document}

